New code parameters

J.Bierbrauer/Y.Edel

May 22, 1997

1 Introduction

We present the parameters of the new codes constructed in the following papers of ours:

ffl New code parameters from Reed-Solomon subfield codes (RS) ffl Extending and lengthening BCH-codes (BCH) ffl Lengthening and the Gilbert-Varshamov bound (LE) ffl Twisted BCH-codes (TW) ffl Some codes related to BCH-codes of low dimension (SM) ffl Inverting construction Y1 (Y) ffl New codes via the lengthening of BCH codes with UEP codes (BET)

In each case we give the length, dimension and minimum distance as well as the source. In most cases we also provide the upper bound on d (given

q, n and k) as given in the data base. An entry opt means that the new code

has maximum possible minimum distance. An entry l � opt means that the length of the code is minimal. The following meet the Griesmer bound with equality:

[448, 9, 224]_2, [983, 7, 654]_3, [992, 7, 660]_3, [1017, 7, 676]_3, [1059, 7, 705]_3,

[1072, 7, 714]_3, [1085, 7, 723]_3, [2916, 8, 1944]_3, [326, 5, 244]_4, [329, 5, 246]_4, [336, 5, 252]_4, [341, 5, 256]_4.

2 Binary codes

length dimension distance upper bound source 155 132 8 opt RS 162 138 8 opt Y 266 240 8 opt RS 273 246 8 opt BCH 275 247 8 BCH 278 248 8 BCH 280 249 8 BCH 286 254 8 BCH 72 46 10 12 RS 265 231 10 BCH 75 43 12 15 BET 265 223 12 RS 273 230 12 BCH 275 231 12 BCH 278 232 12 BCH 280 233 12 BCH 286 238 12 BCH 39 12 14 opt RS 76 39 14 18 BCH 81 42 14 18 BET 265 215 14 BCH 265 207 16 RS 273 214 16 BCH 275 215 16 BCH 278 216 16 BCH 280 217 16 BCH 286 222 16 BCH 265 199 18 BCH 143 79 20 28 RS 145 80 20 29 RS 147 81 20 30 RS 261 191 20 RS 264 192 20 BCH 266 193 20 BCH 2 length dimension distance upper bound source 272 198 20 BCH 274 199 20 BCH 149 78 22 34 BCH 152 79 22 33 BCH 154 80 22 34 BCH 265 187 22 RS 269 190 22 BCH 271 191 22 BCH 274 192 22 BCH 280 197 22 BCH 145 71 24 34 BCH 265 179 24 RS 273 186 24 BCH 275 187 24 BCH 278 188 24 BCH 280 189 24 BCH 154 70 26 38 BET 265 171 26 RS 273 178 26 BCH 275 179 26 BCH 278 180 26 BCH 280 181 26 BCH 143 58 28 40 RS 145 59 28 40 RS 147 60 28 40 RS 265 163 28 RS 273 170 28 BCH 275 171 28 BCH 278 172 28 BCH 280 173 28 BCH 149 57 30 43 BCH 265 155 30 RS 273 162 30 BCH 275 163 30 BCH 278 164 30 BCH 280 165 30 BCH 3 length dimension distance upper bound source 90 18 32 36 RS 132 44 32 41 BCH 136 47 32 42 BCH 140 50 32 42 BCH 145 51 32 44 BCH 148 52 32 45 BCH 152 55 32 46 BCH 211 97 32 53 LE 265 147 32 RS 273 154 32 BCH 275 155 32 BCH 278 156 32 BCH 78 10 34 35 TW 133 37 34 46 LE 143 43 34 48 BCH 259 135 34 BCH 136 37 36 47 LE 144 40 36 49 BCH 148 43 36 50 BCH 260 134 36 BCH 84 10 38 opt TW 139 33 38 50 LE 146 38 38 51 BCH 152 43 38 52 BCH 87 10 40 l-opt TW 133 30 40 49 LE 144 34 40 52 BCH 152 41 40 52 BCH 156 43 40 54 BCH 265 131 40 RS 93 10 42 opt TW 137 30 42 51 LE 143 31 42 53 RS 149 34 42 54 BCH 152 36 42 54 RS 156 39 42 54 BCH 4 length dimension distance upper bound source 160 42 42 55 BCH 162 43 42 56 BCH 202 66 42 62 LE 265 123 42 RS 96 10 44 opt TW 140 30 44 52 RS 146 31 44 54 RS 152 34 44 56 BCH 155 36 44 56 RS 160 40 44 56 BCH 162 41 44 56 BCH 165 43 44 57 BCH 100 10 46 opt TW 147 30 46 56 LE 153 31 46 58 LE 159 33 46 59 BCH 162 35 46 60 BCH 265 115 46 RS 272 118 46 BCH 277 122 46 BCH 103 10 48 l-opt TW 132 23 48 52 RS 136 26 48 52 BCH 152 30 48 58 LE 158 31 48 60 LE 208 57 48 71 LE 219 63 48 74 LE 265 107 48 RS 273 114 48 BCH 275 115 48 BCH 109 10 50 51 SM 141 23 50 57 RS 143 25 50 57 BCH 147 28 50 56 BCH length dimension distance upper bound source 149 29 50 57 BCH 159 30 50 60 LE 208 53 50 74 LE 210 54 50 74 LE 216 57 50 76 LE 208 53 50 74 LE 218 58 50 76 LE 220 59 50 76 LE 265 99 50 RS 112 10 52 opt SM 147 25 52 58 BCH 151 28 52 58 BCH 153 29 52 58 BCH 164 30 52 64 LE 209 52 52 75 LE 212 53 52 76 LE 219 56 52 76 LE 221 57 52 76 LE 116 10 54 opt SM 137 17 54 59 RS 140 19 54 60 BCH 149 23 54 60 BCH 152 24 54 62 RS 154 25 54 62 RS 156 26 54 62 RS 158 27 54 62 RS 160 28 54 63 BCH 162 29 54 64 RS 203 45 54 76 LE 216 52 54 76 SM 224 56 54 79 LE 261 91 54 RS 266 92 54 BCH 119 10 56 opt SM length dimension distance upper bound source 140 17 56 60 RS 152 23 56 62 BCH 155 24 56 63 BCH 157 25 56 64 BCH 159 26 56 64 BCH 162 27 56 65 BCH 165 29 56 66 BCH 207 45 56 76 LE 220 52 56 79 LE 228 56 56 81 LE 265 87 56 RS 269 90 56 BCH 271 91 56 BCH 151 19 58 64 BCH 154 21 58 65 BCH 156 22 58 65 BCH 161 23 58 68 BCH 164 24 58 68 BCH 166 25 58 69 BCH 168 26 58 70 BCH 172 28 58 70 BCH 174 29 58 70 BCH 204 41 58 76 LE 214 45 58 80 LE 218 46 58 81 LE 224 49 58 83 LE 155 19 60 66 BCH 158 21 60 67 BCH 160 22 60 68 BCH 165 23 60 70 BCH 170 25 60 70 BCH 172 26 60 70 BCH 178 29 60 70 BCH 208 41 60 79 LE length dimension distance upper bound source 218 45 60 82 LE 153 16 62 68 BCH 161 18 62 71 BCH 163 19 62 72 BCH 166 21 62 72 BCH 168 22 62 72 BCH 216 41 62 83 LE 233 49 62 87 LE 241 53 62 88 LE 262 72 62 BCH 265 73 62 BCH 268 75 62 BCH 156 16 64 70 BCH 164 18 64 72 BCH 265 71 64 BCH 154 14 66 70 BCH 156 15 66 70 BCH 217 37 66 85 LE 257 57 66 LE 158 14 68 72 BCH 160 15 68 72 BCH 162 14 70 74 BCH 164 15 70 74 BCH 159 12 72 74 BCH 165 14 72 76 BCH 167 15 72 76 BCH 171 11 78 81 TW 174 11 80 82 (Jaffe) TW 177 11 82 84 TW 180 11 84 86 TW 183 11 86 88 TW 186 11 88 opt TW 259 47 88 RS 186 9 90 opt TW length dimension distance upper bound source 189 11 90 opt TW 202 15 90 94 SM 265 45 90 BCH 192 11 92 opt TW 206 15 92 95 SM 258 38 92 BCH 193 9 94 opt TW 196 11 94 l-opt TW 205 13 94 96 SM 210 15 94 97 SM 196 9 96 l-opt TW 199 11 96 l-opt TW 213 15 96 99 SM 258 30 96 BCH 203 9 98 opt TW 207 11 98 100 SM 210 11 100 101 SM 211 9 102 103 TW 214 11 102 103 SM 214 9 104 opt TW 217 11 104 opt SM 258 22 104 BCH 221 11 106 opt SM 221 9 108 opt TW 224 11 108 opt SM 228 11 110 opt SM 228 9 112 l-opt TW 231 11 112 l-opt SM 235 9 114 115 SM 238 10 114 116 SM 240 11 114 116 SM 242 10 116 118 SM 244 11 116 118 SM 246 10 118 120 TW length dimension distance upper bound source 249 11 118 120 SM 249 10 120 121 TW 254 10 122 124 SM 258 11 122 SM 257 10 124 126 SM 261 10 126 BCH 448 12 220 opt SM 452 12 222 opt SM 448 9 224 l-opt SM 455 12 224 opt SM 460 10 226 SM 463 11 226 SM 474 11 232 SM 505 11 248 SM

3 Ternary codes

length dimension distance upper bound source 86 77 5 l-opt RS 134 123 5 Y 39 29 6 opt RS 85 74 6 opt RS 95 83 6 opt Y 103 90 6 7 Y 116 102 6 7 Y 25 14 7 8 sporadic 33 21 7 8 BCH 42 29 7 8 Y 52 38 7 9 Y 85 70 7 8 RS 92 76 7 8 Y 108 91 7 9 Y 103 85 7 10 LE 34 20 8 9 Y 44 29 8 9 BCH 82 66 8 9 RS 86 68 8 10 RS 87 70 8 10 RS 90 71 8 10 BCH 43 25 9 12 LE 85 64 9 12 RS 89 67 9 12 BCH 92 69 9 13 BET 126 101 9 13 BCH 25 10 10 11 BCH 46 25 10 14 LE 88 63 10 14 BCH 91 65 10 15 BCH 86 60 11 16 RS 90 63 11 16 BCH length dimension distance upper bound source 92 64 11 16 RS 96 67 11 17 BCH 83 56 12 16 RS 87 58 12 18 BET 89 58 12 19 RS 90 60 12 18 RS 92 61 12 19 RS 114 80 12 20 LE 126 91 12 20 BCH 140 101 12 BCH 62 33 13 19 LE 86 55 13 19 BCH 88 56 13 20 RS 90 57 13 20 BET 93 59 13 21 BCH 95 60 13 22 BCH 131 91 13 BCH 86 54 14 20 RS 89 56 14 20 BET 96 60 14 22 BET 114 75 14 24 LE 68 34 15 22 LE 85 50 15 22 RS 88 51 15 23 RS 89 53 15 23 BCH 92 55 15 23 BET 94 56 15 24 BET 99 59 15 25 BET 114 72 15 26 LE 116 73 15 26 LE 30 7 16 opt RS 67 33 16 22 LE 70 34 16 24 LE length dimension distance upper bound source 72 35 16 24 LE 88 49 16 25 BCH 90 50 16 25 RS 94 53 16 26 BCH 123 77 16 28 LE 128 81 16 28 BCH 33 8 17 18 RS 72 34 17 25 LE 86 46 17 25 RS 90 49 17 26 BCH 93 51 17 26 BET 96 53 17 27 BCH 98 54 17 28 BCH 100 55 17 28 BCH 126 78 17 30 BCH 130 81 17 30 BCH 133 82 17 BCH 136 84 17 BCH 70 33 18 24 LE 74 34 18 26 LE 89 45 18 28 BCH 114 65 18 31 LE 127 76 18 32 BCH 129 77 18 32 LE 131 78 18 BCH 135 81 18 BCH 65 23 19 27 LE 85 39 19 29 BCH 88 41 19 30 BCH 64 22 20 27 LE 66 23 20 28 LE 122 67 20 35 LE 127 71 20 35 BCH 57 15 21 28 LE length dimension distance upper bound source 82 35 21 30 BCH 86 37 21 31 BCH 89 39 21 32 BCH 125 68 21 36 BCH 129 71 21 36 BCH 132 72 21 BCH 136 75 21 BCH 56 14 22 28 LE 84 35 22 32 BCH 114 56 22 36 LE 133 71 22 BCH 56 13 23 29 LE 84 34 23 32 RS 88 35 23 34 BCH,LE 92 38 23 34 RS 127 66 23 38 BCH 129 67 23 39 LE 131 68 23 BCH 135 71 23 BCH 58 13 24 30 LE 67 18 24 33 LE 85 32 24 34 RS 87 33 24 35 BCH 90 35 24 35 BET 115 53 24 39 LE 68 17 25 34 LE 72 19 25 35 LE 88 31 25 37 BCH 115 50 26 41 LE 120 53 26 42 LE 114 47 27 42 LE 119 50 27 43 LE 116 47 28 43 LE 118 48 28 44 LE length dimension distance upper bound source 115 44 29 45 LE 58 10 30 33 BCH 117 44 30 46 LE 77 17 31 40 LE 86 21 31 42 LE 119 43 31 48 LE 115 40 32 47 LE 80 17 33 42 LE 86 19 33 44 LE 114 37 33 49 LE 119 40 33 50 LE 121 40 34 51 LE 83 17 35 44 LE 87 18 35 45 LE 92 20 35 47 LE 114 34 35 51 LE 119 37 35 52 LE 94 20 36 48 LE 121 37 36 53 LE 86 17 37 46 LE 90 18 37 47 LE 96 20 37 50 LE 98 21 37 50 LE 119 34 37 54 LE 98 21 37 50 LE 94 19 38 49 LE 98 20 38 51 LE 115 31 38 53 LE 121 34 38 55 LE 89 17 39 47 LE 93 18 39 49 LE 96 19 39 50 LE length dimension distance upper bound source 102 21 39 53 RS 122 33 39 56 LE 72 9 40 43 RS 95 18 40 50 LE 98 19 40 51 LE 115 28 40 56 LE 92 17 41 49 LE 97 18 41 52 LE 100 19 41 53 LE 109 24 41 55 RS 112 25 41 56 LE 115 26 41 57 LE 125 33 41 58 LE 127 34 41 59 LE 129 35 41 59 LE 131 36 41 BCH 74 9 42 44 RS 94 17 42 51 LE 99 18 42 53 LE 102 19 42 54 LE 115 25 42 58 LE 120 28 42 59 LE 122 29 42 59 LE 101 18 43 54 LE 104 19 43 55 LE 113 23 43 58 LE 86 15 44 46 RS 88 16 44 47 RS 98 17 44 53 LE 119 25 44 60 LE 121 26 44 61 LE 85 13 45 48 BCH 88 15 45 48 RS 90 16 45 49 RS length dimension distance upper bound source 100 17 45 54 LE 116 23 45 60 LE 121 25 45 62 LE 123 26 45 62 LE 90 14 46 51 BCH 92 15 46 51 BCH 95 16 46 52 BCH 104 17 46 57 LE 114 21 46 60 LE 119 23 46 62 LE 121 24 46 62 LE 123 25 46 63 LE 125 26 46 63 LE 86 11 47 50 RS 89 12 47 51 BCH 92 14 47 52 BCH 94 15 47 52 BCH 96 16 47 53 BCH 127 26 47 64 LE 81 9 48 49 RS 91 12 48 53 BCH 94 14 48 53 BCH 96 15 48 53 BCH 98 16 48 54 BCH 122 23 48 64 LE 124 24 48 64 LE 129 26 48 66 LE 95 13 49 55 RS 120 21 49 64 LE 123 22 49 65 LE 125 23 49 65 LE 127 24 49 66 LE 129 25 49 67 LE length dimension distance upper bound source 86 9 50 52 RS 127 23 50 67 LE 129 24 50 67 LE 91 11 51 54 RS 95 12 51 55 RS 97 13 51 56 BCH 101 15 51 57 RS 103 16 51 57 RS 123 21 51 66 LE 129 23 51 68 LE 94 10 52 57 BCH 96 11 52 57 RS 100 12 52 58 BCH 102 13 52 59 BCH 106 15 52 60 BCH 108 16 52 60 BCH 121 19 52 66 LE 127 21 52 68 LE 129 22 52 69 LE 95 10 53 57 BCH 97 11 53 58 BCH 101 12 53 59 BCH 105 14 53 60 BCH 107 15 53 61 BCH 85 7 54 l-opt RS 97 10 54 59 BCH 99 11 54 59 BCH 103 12 54 60 BCH 105 13 54 61 BCH 107 14 54 62 BCH 109 15 54 62 RS 111 16 54 62 RS 124 19 54 68 LE 101 10 55 61 BCH 103 11 55 62 BCH length dimension distance upper bound source 102 10 56 62 BET 104 11 56 62 BET 123 17 56 69 LE 92 7 57 58 BCH 96 7 60 61 BCH 126 17 58 71 LE 129 17 60 73 LE 98 7 61 62 SM 100 7 63 opt SM 123 16 63 70 BCH 127 15 65 74 BCH 129 16 65 74 BCH 104 7 66 opt SM 129 13 67 76 BCH 128 12 68 77 BCH 108 7 69 opt SM 123 11 69 75 BCH 132 15 69 BCH 134 16 69 BCH 129 11 71 79 BCH 112 7 72 l-opt SM 118 7 74 75 SM 120 7 75 77 SM 134 11 75 BCH 123 7 77 79 SM 125 7 78 81 RS 129 7 81 83 BCH 308 8 201 SM 312 8 204 SM 316 8 207 opt SM 320 8 210 opt SM 324 8 213 opt SM 336 9 215 TW 328 8 216 opt SM length dimension distance upper bound source 340 8 222 SM 343 8 223 SM 354 8 231 SM 981 10 645 TW 983 7 654 l-opt TW 992 7 660 l-opt TW 1006 7 669 opt TW 1017 7 676 l-opt TW 1033 7 687 opt TW 1046 7 696 opt TW 1059 7 705 l-opt TW 1072 7 714 l-opt TW 1085 7 723 l-opt TW 2916 11 1935 TW 2916 8 1944 l-opt TW

4 Quaternary codes

length dimension distance upper bound source 65 57 5 l-opt RS 87 78 5 6 Y 145 135 5 Y 32 23 6 7 RS 81 70 6 7 RS 106 94 6 7 Y 70 57 7 8 RS 73 58 7 10 LE 110 91 8 12 LE 112 92 8 12 LE 42 25 9 13 LE 69 50 9 13 BCH 73 53 9 14 BCH 68 48 10 14 RS 72 51 10 15 BET 90 67 10 16 BCH 93 69 10 16 BCH 67 45 11 16 RS 70 47 11 16 BCH 74 50 11 17 BET 89 63 11 18 BCH 94 67 11 18 BCH 69 44 12 18 BCH 72 46 12 19 BCH 87 59 12 20 LE 49 24 13 19 LE 69 41 13 21 BCH 73 44 13 21 BCH 48 23 14 LE 68 39 14 22 RS length dimension distance upper bound source 72 42 14 22 BET 75 44 14 23 BET 42 15 15 LE 67 36 15 23 RS 70 38 15 24 BCH 74 41 15 24 BET 87 50 16 LE 45 15 17 LE 62 28 17 LE 64 29 17 LE 66 29 18 LE 43 12 19 24 BCH 65 28 19 LE 67 29 19 28 LE 87 43 20 LE 68 28 21 LE 70 29 21 31 LE 73 30 21 LE 76 33 21 32 RS 78 34 21 32 LE 70 28 22 31 RS 73 30 22 32 RS 75 31 22 33 RS 78 33 22 33 RS 82 36 22 34 RS 65 27 23 29 RS 71 28 23 LE 74 29 23 33 LE 76 30 23 34 RS 80 33 23 35 RS 86 37 23 36 LE length dimension distance upper bound source 67 26 24 31 RS 69 27 24 31 RS 74 28 24 34 LE 76 29 24 35 LE 88 37 24 LE 69 25 25 33 BCH 72 27 25 33 BCH 77 28 25 36 LE 79 29 25 37 LE 81 30 25 38 LE 72 26 26 34 BET 70 24 26 34 RS 81 29 26 38 LE 87 33 26 LE 69 23 27 34 RS 71 24 27 35 BET 74 26 27 36 RS 76 27 27 36 RS 80 28 27 38 LE 86 31 27 LE 67 20 28 35 RS 71 22 28 37 BCH 73 23 28 37 BCH 76 25 28 38 BCH 78 26 28 38 BCH 80 27 28 39 BCH 88 31 28 LE 69 19 29 37 BCH 75 22 29 39 BCH 77 23 29 40 BCH length dimension distance upper bound source 80 25 29 41 BCH 82 26 29 41 BCH 84 27 29 42 BCH 72 20 30 39 BET 76 22 30 40 BET 79 23 30 41 BCH 69 17 31 39 RS 71 18 31 40 BET 74 20 31 40 RS 78 22 31 41 BCH 80 23 31 42 BCH 83 25 31 43 BCH 87 27 31 44 BCH 83 23 32 LE 87 24 33 LE 89 25 33 LE 89 24 34 LE 88 23 35 LE 90 24 35 48 LE 92 25 35 49 LE 94 26 35 50 LE 53 6 36 opt BCH 90 23 36 LE 94 25 36 LE 88 20 37 LE 101 27 38 LE 101 25 40 LE 103 26 40 LE 103 24 42 LE 105 25 42 LE 103 23 43 LE 105 24 43 LE length dimension distance upper bound source 67 7 45 46 RS 104 22 45 LE 108 24 45 LE 110 25 45 LE 70 8 46 47 RS 106 22 46 LE 110 24 46 LE 115 27 46 LE 121 30 47 LE 70 7 48 l-opt RS 72 8 48 49 BET 123 30 48 LE 77 7 52 54 BET 77 8 50 53 BCH 117 24 50 LE 122 26 51 LE 125 26 53 LE 130 28 54 LE 97 8 63 68 RS 95 6 66 68 BCH 325 7 240 SM 326 5 244 l-opt TW 329 5 246 l-opt TW 336 5 252 l-opt TW 341 5 256 l-opt TW 1285 8 960 opt SM